-- MySQL Workbench Forward Engineering

SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0;
SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0;
SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='TRADITIONAL,ALLOW_INVALID_DATES';

-- -----------------------------------------------------
-- Schema projetphp
-- -----------------------------------------------------

-- -----------------------------------------------------
-- Schema projetphp
-- -----------------------------------------------------
CREATE SCHEMA IF NOT EXISTS `projetphp` DEFAULT CHARACTER SET utf8 ;
USE `projetphp` ;

-- -----------------------------------------------------
-- Table `projetphp`.`Medecin`
-- -----------------------------------------------------
CREATE TABLE IF NOT EXISTS `projetphp`.`Medecin` (
  `id` INT NOT NULL AUTO_INCREMENT,
  `Civilite` CHAR(1) NOT NULL,
  `Prenom` VARCHAR(45) NOT NULL,
  `Nom` VARCHAR(45) NOT NULL,
  PRIMARY KEY (`id`),
  UNIQUE INDEX `id_UNIQUE` (`id` ASC))
ENGINE = InnoDB;


-- -----------------------------------------------------
-- Table `projetphp`.`Patient`
-- -----------------------------------------------------
CREATE TABLE IF NOT EXISTS `projetphp`.`Patient` (
  `Civilite` CHAR(1) NOT NULL,
  `Nom` VARCHAR(45) CHARACTER SET 'big5' NOT NULL,
  `Prenom` VARCHAR(45) NOT NULL,
  `Adresse` VARCHAR(100) NOT NULL,
  `Ville` VARCHAR(50) NOT NULL,
  `CodePostal` SMALLINT(4) NOT NULL,
  `DateNaissance` DATE NOT NULL,
  `LieuNaissance` VARCHAR(50) NOT NULL,
  `NumSecuriteSociale` INT(15) NOT NULL,
  `Id` INT NOT NULL AUTO_INCREMENT,
  `MedecinTraitant` INT NULL,
  UNIQUE INDEX `NumSecuriteSociale_UNIQUE` (`NumSecuriteSociale` ASC),
  PRIMARY KEY (`Id`),
  UNIQUE INDEX `Id_UNIQUE` (`Id` ASC),
  INDEX `fk_Patient_Medecin_idx` (`MedecinTraitant` ASC),
  CONSTRAINT `fk_Patient_Medecin`
    FOREIGN KEY (`MedecinTraitant`)
    REFERENCES `projetphp`.`Medecin` (`id`)
    ON DELETE NO ACTION
    ON UPDATE NO ACTION)
ENGINE = InnoDB;


-- -----------------------------------------------------
-- Table `projetphp`.`RDV`
-- -----------------------------------------------------
CREATE TABLE IF NOT EXISTS `projetphp`.`RDV` (
  `id` INT NOT NULL,
  `DateRDV` TIMESTAMP NULL,
  `Duree` TIME NULL,
  `Patient_Id` INT NOT NULL,
  `Medecin_id` INT NOT NULL,
  PRIMARY KEY (`id`),
  INDEX `fk_RDV_Patient1_idx` (`Patient_Id` ASC),
  INDEX `fk_RDV_Medecin1_idx` (`Medecin_id` ASC),
  CONSTRAINT `fk_RDV_Patient1`
    FOREIGN KEY (`Patient_Id`)
    REFERENCES `projetphp`.`Patient` (`Id`)
    ON DELETE NO ACTION
    ON UPDATE NO ACTION,
  CONSTRAINT `fk_RDV_Medecin1`
    FOREIGN KEY (`Medecin_id`)
    REFERENCES `projetphp`.`Medecin` (`id`)
    ON DELETE NO ACTION
    ON UPDATE NO ACTION)
ENGINE = InnoDB;


SET SQL_MODE=@OLD_SQL_MODE;
SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS;
SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS;
